Council directive 92/23/EEC
of 31 March 1992
relating to tyres for motor vehicles and their trailers and to their fitting (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 1a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 11 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 12 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I ADMINISTRATIVE PROVISIONS FOR THE EC TYPE-APPROVAL OF TYRES

1. APPLICATION FOR THE EC TYPE-APPROVAL OF A TYPE OF TYRE
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. INSCRIPTIONS
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. EC TYPE-APPROVAL
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. EC TYPE-APPROVAL MARKING
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MODIFICATION OF A TYRE TYPE
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. CONFORMITY OF PRODUCTION
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 INFORMATION DOCUMENT No … RELATING TO EC TYPE-APPROVAL FOR A TYPE OF TYRE
(Annex II to Directive 92/23/EEC)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 EC TYPE-APPROVAL CERTIFICATE
(tyres)
MODEL
(maximum format: A4 (210 mm × 297 mm))
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Appendix 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II REQUIREMENTS FOR TYRES

1. DEFINITIONS

2. For the purposes of this Directive:
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.17.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.27. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.28.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.29.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.30.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.31.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. MARKING REQUIREMENTS
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

POSITION OF MARKINGS
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(4.)
(5.)
(6.) 6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.4.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.1.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 Explanatory figure
(see Annex II, sections 2 and 6.1)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 LIST OF SYMBOLS OF LOAD-CAPACITY INDICES (LI) AND CORRESPONDING MAXIMUM MASS TO BE CARRIED (GK)
(see Annex II, section 2.28)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 3 ARRANGEMENT OF TYRE MARKINGS
(see Annex II, section 3.2)
PART A: PASSENGER CAR TYRES . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART B: COMMERCIAL VEHICLE TYRES . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 4 RELATIONSHIP BETWEEN THE PRESSURE INDEX AND THE UNITS OF PRESSURE
(see Annex II, Appendix 7, Part B, section 1.3)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 5 MEASURING RIM, OUTER DIAMETER AND SECTION WIDTH OF TYRES OF CERTAIN SIZE DESIGNATIONS
(see Annex II, sections 6.1.1.2 and 6.1.2.2)
PART A: PASSENCER CAR TYRES
PART B: COMMERCIAL VEHICLE TYRES

Appendix 6 METHOD OF MEASURING TYRE DIMENSIONS
(see Annex II section 6.1.3)
PART A: PASSENGER CAR TYRES 1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART B: COMMERCIAL VEHICLE TYRES 1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 7 LOAD/SPEED TEST-PROCEDURE
(see Annex II, section 6.2)
PART A: PASSENGER CAR TYRES

1. Preparing the tyre
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Carrying out the test
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Equivalent test methods
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART B: COMMERCIAL VEHICLE TYRES

1. Preparing the tyre
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Test procedure
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Equivalent test methods
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 8 VARIATION OF LOAD CAPACITY WITH SPEED
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX III ADMINISTRATIVE PROVISIONS FOR THE TYPE-APPROVAL OF VEHICLES WITH REGARD TO THE FITTING OF THEIR TYRES

1. APPLICATION FOR THE EC TYPE-APPROVAL OF A VEHICLE TYPE
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. EC TYPE-APPROVAL OF A VEHICLE
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. MODIFICATION OF VEHICLE TYPE
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. CONFORMITY OF PRODUCTION
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. PRODUCTION DEFINITIVELY DISCONTINUED
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 INFORMATION DOCUMENT No...
IN ACCORDANCE WITH ANNEX I TO COUNCIL DIRECTIVE 70/156/EEC RELATING TO EC TYPE-APPROVAL OF A VEHICLE TYPE WITH REGARD TO THE FITTING OF ITS TYRES
(DIRECTIVE 92/23/EEC)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 MODEL
[(maximum format: A4 (210 × 297 mm)]
EC TYPE-APPROVAL CERTIFICATE
(vehicle)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX IV REQUIREMENTS FOR VEHICLES WITH REGARD TO THE FITTING OF THEIR TYRES

1. DEFINITIONS

2. For the purpose of this Directive:
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7.0. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.1.1. category 1
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.1.2. category 2
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.1.3. category 3
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.7.1.4. category 4
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. REQUIREMENTS FOR VEHICLES WITH REGARD TO THE FITTING OF THEIR TYRES

3.1. General
3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Tyre fitment
3.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Load capacity
3.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.4. Speed capacity
3.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.5. Spare tyre
3.5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.6. Inflating device of temporary-use spare unit:
3.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.7. Special cases
3.7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.8. Specifications for temporary-use spare units
3.8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX V TYRE/ROAD NOISE EMISSION

1. SCOPE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. DEFINITIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. MARKING REQUIREMENTS
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. TYRE/ROAD NOISE EMISSION REQUIREMENTS

4.1. General requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 1 TEST METHOD FOR TYRE-ROAD SOUND LEVELS COAST-BY METHOD

0. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. Measuring instruments

1.1. Acoustic measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.1. Calibration
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.2. Compliance with requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.1.3. Positioning of the microphone
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Speed measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Temperature measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.1. Air temperature
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3.2. Test surface temperature
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.4. Wind measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Conditions of measurement

2.1. Test site
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Meteorological conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Ambient noise
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Test vehicle requirements

2.4.1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.2. Vehicle load
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.3. Wheelbase
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4.4. Measures to minimise vehicle influence on sound level measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Tyres

2.5.1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.2. Tyre loads
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.3. Tyre inflation pressure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5.4. Preparations prior to testing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Method of testing

3.1. General conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Nature and number of measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Test speeds
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Interpretation of results
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.1. Determination of test result
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Regression analysis of noise measurements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Temperature correction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Appendix 2 TEST REPORT
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX VI SPECIFICATIONS FOR THE TEST SITE

1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Required characteristics of the surface
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.1. Residual voids content
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Sound absorption coefficient
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Texture depth
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.4. Homogeneity of the surface
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.5. Period of testing
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Test surface design

3.1. Area
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Design and preparation of the surface

3.2.1. Basic design requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.2. Design guidelines
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Test method

4.1. Measurement of the residual voids content
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Sound absorption coefficient
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Volumetric macrotexture measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Stability in time and maintenance

5.1. Age influence
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2. Maintenance of the surface
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3. Repaving the test area
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Documentation of the test surface and of tests performed on it

6.1. Documentation of the test surface
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2. Documentation of vehicle noise tests conducted on the surface
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .