Article 3
The Commission shall be authorized to amend the following:
- Annex II to the Directives referred to in Article 1 (1);
- Article 1 (2) (a) to Directive 80/1177/EEC;
- Annexes I and II to Directive 90/377/EEC, after consulting the competent committee in accordance with the procedure laid down in Article 7 of that Directive.