Council Directive
of 4 December 1990
on the operational protection of outside workers exposed to the risk of ionizing radiation during their activities in controlled areas
(90/641/Euratom) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Directive 2013/59/Euratom of 5 December 2013 laying down basic safety standards for protection against the dangers arising from exposure to ionising radiation, and repealing Directives 89/618/Euratom, 90/641/Euratom, 96/29/Euratom, 97/43/Euratom and 2003/122/Euratom.

TITLE I Purpose and definitions
Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE II Obligations of Member States' competent authorities
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE III Obligations of outside undertakings and operators
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE IV Obligations of outside workers
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

TITLE V Final provisions
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I PROVISIONS COMMON TO THE NETWORKS AND INDIVIDUAL DOCUMENTS REFERRED TO IN ARTICLE 4 (2)
PART I

1. Any radiological monitoring system of the Member States for outside workers must comprise the following three sections:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART II . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART III . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II PROVISIONS ADDITIONAL TO THOSE OF ANNEX I CONCERNING THE INDIVIDUAL RADIOLOGICAL MONITORING DOCUMENT
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .