ANNEX

PART B REVISED GUIDANCE FOR THE CONDUCT OF TEST FACILITY INSPECTIONS AND STUDY AUDITS

Inspection procedures

Facilities
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2004/9/EC of the European Parliament and of the Council of 11 February 2004 on the inspection and verification of good laboratory practice (GLP) (Codified version) (Text with EEA relevance).