Council Directive
of 12 June 1986
on limit values and quality objectives for discharges of certain dangerous substances included in List I of the Annex to Directive 76/464/EEC
(86/280/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2008/105/EC of the European Parliament and of the Council of 16 December 2008 on environmental quality standards in the field of water policy, amending and subsequently repealing Council Directives 82/176/EEC, 83/513/EEC, 84/156/EEC, 84/491/EEC, 86/280/EEC and amending Directive 2000/60/EC of the European Parliament and of the Council.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX I GENERAL PROVISIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

HEADING A Limit values, dates set for compliance therewith and procedures for monitoring discharges
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

HEADING B Quality objectives, dates set for compliance therewith and procedure for monitoring compliance with them
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

HEADING C Reference methods of measurement and limit of detection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX II SPECIFIC PROVISIONS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

I. Specific provisions relating to carbon tetrachloride (No 13)
CAS No 56-23-5

Heading A (13): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (13): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (13): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. Specific provisions relating to DDT (No 46)
CAS No 50 - 29 - 3
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (46): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (46): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

III. Specific provisions relating to pentachlorophenol (No 102)
CAS 87-86-5

Heading A (102): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (102): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (102): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

IV. Specific provisions relating to:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading A (1, 71, 77, 130): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (1, 71, 77, 130): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (1, 71, 77, 130): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

V. Specific dispositions relating to hexachlorobenzene (HCB) (No 83)
CAS-118-74-1

Heading A (83): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (83): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (83): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VI. Specific provisions relating to hexachlorobutadiene (HCBD) (No 84)
CAS-87-68-3

Heading A (84): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (84): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (84): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VII. Specific provisions relating to chloroform (CHCl3) (No 23)
CAS-67-66-3

Heading A (23): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (23): Quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (23): Reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

VIII. Specific provisions relating to 1,2-dichloroethane (EDC) (No 59)
CAS — 107-06-2

Heading A (59): Limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (59): quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (59): reference method measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

IX. Specific provisions relating to trichloroethylene (TRI) (No 121)
CAS 79.01.6

Heading A (121): limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (121): quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (121): reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

X. Specific provisions relating to perchloroethylene (PER) (No 111)
CAS-127-18-4

Heading A (111): limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (111): quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (111): reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Xl. Specific provisions relating to trichlorobenzene (TCB) (117, 118)

Heading A (117, 118): limit values for emission standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading B (117, 118): quality objectives
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Heading C (117, 118): reference method of measurement
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .