Article 3
Adaptations to be made to the Annex to this Directive in the light of progress in scientific and technical knowledge shall be adopted in accordance with the procedure laid down in Article 10 of Directive 76/893/EEC .
OJ No L 340, 9. 12. 1976, p. 19.