Article 1
Member States shall take all necessary steps to ensure that during official testing of cosmetic products:
- identification and determination of glycerol l-(4-aminobenzoate),
- determination of chlorobutanol,
- identification and determination of quinine,
- identification and determination of inorganic sulphites and hydrogen sulphites,
- identification and determination of chlorates of the alkali metals, and
- identification and determination of sodium iodate are performed in accordance with the methods described in the Annex.