Commission Directive
of 29 April 1981
laying down the Community method of analysis for the official control of vinyl chloride released by materials and articles into foodstuffs
(81/432/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) No 10/2011 of 14 January 2011 on plastic materials and articles intended to come into contact with food Text with EEA relevance.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX DETERMINATION OF VINYL CHLORIDE RELEASED BY MATERIALS AND ARTICLES INTO FOODSTUFFS

1. SCOPE AND FIELD OF APPLICATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. PRINCIPLE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. REAGENTS
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. APPARATUS
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Gas-chromatographic column
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.4. Sample phials or flasks fitted with silicon or butyl rubber septa
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. PROCEDURE

5.1. Preparation of standard VC solution (solution A)

5.1.1. Concentrated standard VC solution at approximately 2 000 mg/kg
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.1.2. Preparation of dilute standard VC solution
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.1.3. Preparation of the response curve with solution A

5.2. Validation of preparation of standard solutions obtained in point 5.1

5.2.1. Preparation of a second standard VC solution (solution B)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.2. Validation of solution A
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3. Preparation of the ‘addition’ curve

5.3.1. Preparation of sample
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3.2. Procedure
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.4. Gas-chromatographic determinations
5.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. RESULTS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. CONFIRMATION OF THE VC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. REPEATABILITY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .