Council Directive
of 12 June 1978
on the approximation of the laws of the Member States relating to the wheel guards of motor vehicles
(78/549/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
List of Annexes
ANNEX I
GENERAL REQUIREMENTS, SPECIAL REQUIREMENTS, USE OF CHAINS, APPLICATION FOR EEC TYPE-APPROVAL, GRANTING OF EEC TYPE-APPROVAL, AMENDMENTS TO APPROVALS, CONFORMITY OF PRODUCTION

1. GENERAL REQUIREMENTS
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. SPECIAL REQUIREMENTS
2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. USE OF CHAINS
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. APPLICATION FOR EEC TYPE-APPROVAL
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.1. — . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2.2. — . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. GRANTING OF EEC TYPE-APPROVAL
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. MODIFICATIONS OF THE TYPE AND AMENDMENTS TO APPROVALS
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. CONFORMITY OF PRODUCTION
7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

0 GENERAL
0.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.3.1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
0.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1. GENERAL CONSTRUCTION CHARACTERISTICS OF THE VEHICLE
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. MASSES AND DIMENSIONS (e)
(in kg and mm) (refer to drawing where applicable)
2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.1.3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.4.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. SUSPENSION
6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1.1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1.1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1.1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.1.1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. BODYWORK
9.16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.16.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.16.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX III
Appendix
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Regulation (EC) No 661/2009 of the European Parliament and of the Council of 13 July 2009 concerning type-approval requirements for the general safety of motor vehicles, their trailers and systems, components and separate technical units intended therefor (Text with EEA relevance).