CHAPTER V

Final provisions
Article 28
Before expiry of the three-year period provided for in Directive 77/391/EEC, the Commission shall submit to the Council a report on the application of the plans provided for in that Directive, accompanied if necessary by proposals to achieve closer harmonization of national preventive measures.