Council Directive
of 19 November 1973
on the approximation of the laws of the Member States relating to material measures of length
(73/362/EEC) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2004/22/EC of the European Parliament and of the Council of 31 March 2004 on measuring instruments (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

1. Definitions
1.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Materials
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Construction
3.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Graduation and numbering
4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. Nominal length
5.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. Inscriptions
6.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
6.8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. Maximum permissible errors
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2. 7.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
7.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

8. EEC initial verification marks
8.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
8.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9. Different kinds of measures of length referred to by the Directive

9.1. End, line or composite tape measures made of fibreglass and plastics
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9.2. Measures made in one piece, rigid or semi-rigid, in metal or other material
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9.4. Steel tape measures
9.4.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.4.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
9.4.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

9.5. Composite dip-tapes made of metal, with sinkers, used for checking the level of liquids
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10. EEC pattern approval and EEC initial verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10.1. EEC pattern-approval examination
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

10.2. EEC initial verification checks
10.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10.2.3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10.2.4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
10.2.5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11. Statistical check applied as an EEC initial verification check
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1. General

11.1.1. Lot
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.2. Sample
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.3. Statistical check by attributes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.4. Limiting quality level (LQ 5)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.5. Acceptable quality level (SQL)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.6. Acceptance number
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.7. Rejection number
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.8. Simple sampling plan
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.1.9. Double sampling plan
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.2. Inspection procedures
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11.2.1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
11.2.2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

11.3. Consequences of frequent rejection of lots
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

12. Example of the EEC initial verification mark described in point 8.3: