Article 1. . . . . . . . . ....
Article 2. . . . . . . . . ....
Article 3. . . . . . . . . ....
Article 4. . . . . . . . . ....
ANNEX
CHAPTER I
ZEROISING MECHANISM FOR VOLUME INDICATORS
1.1.. . . . . . . . . ....
1.2.. . . . . . . . . ....
1.3.. . . . . . . . . ....
1.4.
. . . . . . . . . ....
1.4.1.. . . . . . . . . ....
1.4.2.. . . . . . . . . ....
1.5.. . . . . . . . . ....
CHAPTER II
TOTALISING VOLUME COUNTERS
2.1.. . . . . . . . . ....
2.2.. . . . . . . . . ....
2.3.. . . . . . . . . ....
2.4.. . . . . . . . . ....
2.5.. . . . . . . . . ....
2.6.. . . . . . . . . ....
2.7.. . . . . . . . . ....
CHAPTER III
MULTIPLE VOLUME INDICATING MECHANISMS
3.1.. . . . . . . . . ....
3.2.. . . . . . . . . ....
3.3.. . . . . . . . . ....
3.4.. . . . . . . . . ....
CHAPTER IV
PRICE COMPUTING MECHANISMS
4.1.. . . . . . . . . ....
4.2.. . . . . . . . . ....
4.3.. . . . . . . . . ....
4.4.. . . . . . . . . ....
4.5.. . . . . . . . . ....
4.6.. . . . . . . . . ....
4.7.. . . . . . . . . ....
4.8.1.. . . . . . . . . ....
4.8.2.. . . . . . . . . ....
4.9.. . . . . . . . . ....
4.10.. . . . . . . . . ....
CHAPTER V
PRINTING MECHANISMS
5.1.. . . . . . . . . ....
5.2.. . . . . . . . . ....
5.3.. . . . . . . . . ....
5.4.. . . . . . . . . ....
5.5.. . . . . . . . . ....
5.6.. . . . . . . . . ....
5.7.. . . . . . . . . ....
5.8.. . . . . . . . . ....
5.9.. . . . . . . . . ....
5.10.. . . . . . . . . ....
5.11.. . . . . . . . . ....
5.12.. . . . . . . . . ....
5.13.1.. . . . . . . . . ....
5.13.2.. . . . . . . . . ....
CHAPTER VI
PRE-SETTING MECHANISMS
6.1.. . . . . . . . . ....
6.2.. . . . . . . . . ....
6.3.. . . . . . . . . ....
6.4.. . . . . . . . . ....
6.5.. . . . . . . . . ....
6.6.. . . . . . . . . ....
6.7.. . . . . . . . . ....
6.8.. . . . . . . . . ....
6.9.. . . . . . . . . ....
6.10.. . . . . . . . . ....
6.11.. . . . . . . . . ....
6.12.. . . . . . . . . ....
6.13.. . . . . . . . . ....
CHAPTER VII
SEALING
7.1.. . . . . . . . . ....
Council Directive
of 12 October 1971
on the approximation of the laws of the Member States relating to ancillary equipment for meters for liquids other than water
(71/348/EEC) (repealed)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Directive 2004/22/EC of the European Parliament and of the Council of 31 March 2004 on measuring instruments (Text with EEA relevance).