Commission Implementing Decision (EU) 2020/414
of 19 March 2020
amending Implementing Decision (EU) 2019/570 as regards medical stockpiling rescEU capacities
(notified under document C(2020) 1827)
(Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (14.8.2021) by The Union Civil Protection Mechanism (Revocation) (EU Exit) Regulations 2021 (S.I. 2021/896), regs. 1(2), 2(j)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .