Commission Implementing Decision (EU) 2020/2239
of 23 December 2020
concerning the extension of the action taken by the United Kingdom Health and Safety Executive permitting the making available on the market and use of hand disinfection products following the WHO-recommended Formulation 2 in accordance with Regulation (EU) No 528/2012 of the European Parliament and of the Council
(Only the English text is authentic) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.1.2024) by Retained EU Law (Revocation and Reform) Act 2023 (c. 28), ss. 1(1), 22(3), Sch. 1 Pt. 2 (with s. 1(3)(4)); S.I. 2023/1363, reg. 2

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .