Article 1
Decision 2010/452/CFSP is amended as follows:
1. in Article 14(1), the following subparagraph is added:
The financial reference amount intended to cover the expenditure related to the Mission between 15 December 2020 and 14 December 2022 shall be EUR 44 823 402,79.
;
2. in Article 18, the second paragraph is replaced by the following:
It shall expire on 14 December 2022.
.