Article 1
The references to harmonised standards for radio equipment drafted in support of Directive 2014/53/EUlisted in Annex I to this Decision, are hereby published in the Official Journal of the European Union.
The references to harmonised standards for radio equipment drafted in support of Directive 2014/53/EUlisted in Annex II to this Decision, are hereby published in the Official Journal of the European Union with restriction.