Commission Implementing Decision (EU) 2020/1606
of 30 October 2020
concerning certain interim protective measures in relation to highly pathogenic avian influenza of subtype H5N8 in the Netherlands
(notified under document C(2020) 7633)
(Only the Dutch text is authentic)
(Text with EEA relevance) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Decision (EU) 2020/1809 of 30 November 2020 concerning certain protective measures in relation to outbreaks of highly pathogenic avian influenza in certain Member States (notified under document C(2020) 8591) (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX PART A . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Member State: The Netherlands
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
PART B . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Member State: The Netherlands
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Repealed by Commission Implementing Decision (EU) 2020/1809 of 30 November 2020 concerning certain protective measures in relation to outbreaks of highly pathogenic avian influenza in certain Member States (notified under document C(2020) 8591) (Text with EEA relevance).