Article 1
Decision 2009/11/EC is amended as follows:
1. Article 1 is amended as follows:
  1. the first paragraph is amended as follows:
    1. point (c) is deleted;
    2. point (i) is replaced by the following:
      1. the “gmSCAN” apparatus and the assessment methods related thereto, details of which are given in Part 9 of the Annex;
;
    3. the following point (j) is added:
      1. the “OptiScan TP” apparatus and the assessment methods related thereto, details of which are given in Part 10 of the Annex.
;
  2. the second paragraph is replaced by the following:
The manual method ZP with a ruler, referred to in point (g) of the first paragraph, shall only be authorised for abattoirs:
    1. where the number of slaughters does not exceed 700 pigs per week on yearly average basis; and
    2. having a slaughter line with a capacity to process no more than 50 pigs per hour.
;
2. the Annex is amended in accordance with the Annex to this Decision.
Article 2
This Decision is addressed to the Kingdom of Spain.
Done at Brussels, 23 January 2020.
For the Commission
Janusz Wojciechowski
Member of the Commission