Commission Implementing Decision (EU) 2019/313
of 21 February 2019
on the approval of the technology used in SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter for use in conventional combustion engine and certain hybrid powered light commercial vehicles as an innovative technology for reducing CO2 emissions from light commercial vehicles pursuant to Regulation (EU) No 510/2011 of the European Parliament and of the Council
(Text with EEA relevance)

THE EUROPEAN COMMISSION,
Having regard to the Treaty on the Functioning of the European Union,
Having regard to Regulation (EU) No 510/2011 of the European Parliament and of the Council of 11 May 2011 setting emission performance standards for new light commercial vehicles as part of the Union's integrated approach to reduce CO2 emissions from light-duty vehicles, and in particular Article 12(4) thereof,
OJ L 145, 31.5.2011, p. 1.
Whereas:
(1) On 14 May 2018, the supplier SEG Automotive Germany GmbH submitted an application for the approval of the High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter for N1 vehicles as an eco-innovation. The application has been assessed in accordance with Article 12 of Regulation (EU) No 510/2011 and Commission Implementing Regulation (EU) No 427/2014.
Commission Implementing Regulation (EU) No 427/2014 of 25 April 2014 establishing a procedure for the approval and certification of innovative technologies for reducing CO2 emissions from light commercial vehicles pursuant to Regulation (EU) No 510/2011 of the European Parliament and of the Council (OJ L 125, 26.4.2014, p. 57).
(2) The 48V motor generator is a reversible machine that may operate as either an electric motor converting electrical energy into mechanical energy, or a generator converting mechanical energy into electrical energy as a standard alternator. The application submitted focused on the generation function of the component.
(3) The applicant proposed two different methodologies to determine the total efficiency of the system, combining the efficiency of the 48V motor generator and the efficiency of the 48V/12V DC/DC converter. The first method aims to calculate the efficiency of the 48V motor generator and its 48V/12V DC/DC converter separately, while the second method aims to calculate the efficiency of the 48V motor generator plus its 48V/12V DC/DC converter (combined method). Both testing procedures are in line with the Technical Guidelines for the preparation of applications for the approval of innovative technologies pursuant to Regulation (EU) No 510/2011.
(4) The information provided in the application demonstrates that the conditions and the criteria referred to in Article 12 of Regulation (EU) No 510/2011 and in Articles 2 and 4 of Implementing Regulation (EU) No 427/2014 have been met in for the two proposed case studies. As a consequence, the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter applied to N1 vehicles should be approved as an eco-innovation.
(5) It is appropriate to approve the testing methodologies for determining the CO2 savings from the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter. Only emission savings certified on the basis of one of the two testing methodologies set out in this Decision can be taken into account for determining a manufacturer's specific emission performance pursuant to Regulation (EU) No 510/2011.
(6) In order to determine the CO2 savings from the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter, it is necessary to establish the baseline technology against which the efficiency of the generator function should be assessed. Taking into account expert judgement it is appropriate to consider an alternator with 67 % efficiency as baseline technology to be used for the purpose of determining the CO2 savings under this Decision.
(7) In the case of hybrid N1 vehicles, the testing methodologies are based on certain conditions that are only valid for vehicles for which it is allowed to use uncorrected measurements like the fuel consumption or the CO2 emissions measured during type 1 test as specified in Annex 8 to UNECE Regulation No 101. This is why the scope of this decision applies to any internal combustion engine powered N1 vehicles, but is limited to certain hybrid N1 vehicles only.
(8) The savings from the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter may be partially demonstrated on the test referred to in Annex XII to Commission Regulation (EC) No 692/2008. It is therefore necessary to ensure that this partial coverage is taken into account in the testing methodology for CO2 savings from the motor generator.
Commission Regulation (EC) No 692/2008 of 18 July 2008 implementing and amending Regulation (EC) No 715/2007 of the European Parliament and of the Council on type-approval of motor vehicles with respect to emissions from light passenger and commercial vehicles (Euro 5 and Euro 6) and on access to vehicle repair and maintenance information (OJ L 199, 28.7.2008, p. 1).
(9) If the type approval authority finds that the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter does not satisfy the conditions for certification, the application for certification of the savings should be rejected.
(10) This Decision should apply until 2020 inclusive in relation to the test procedure referred to in Annex XII to Regulation (EC) No 692/2008. With effect from 1 January 2021, innovative technologies are to be assessed in relation to the test procedure laid down in Commission Implementing Regulation (EU) 2017/1151.
Commission Regulation (EU) 2017/1151 of 1 June 2017 supplementing Regulation (EC) No 715/2007 of the European Parliament and of the Council on type-approval of motor vehicles with respect to emissions from light passenger and commercial vehicles (Euro 5 and Euro 6) and on access to vehicle repair and maintenance information, amending Directive 2007/46/EC of the European Parliament and of the Council, Commission Regulation (EC) No 692/2008 and Commission Regulation (EU) No 1230/2012 and repealing Commission Regulation (EC) No 692/2008 (OJ L 175, 7.7.2017, p. 1).
(11) For the purposes of determining the general eco-innovation code to be used in the relevant type approval documents in accordance with Annexes I, VIII and IX to Directive 2007/46/EC of the European Parliament and of the Council, the individual code to be used for the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter should be specified,
Directive 2007/46/EC of the European Parliament and of the Council of 5 September 2007 establishing a framework for the approval of motor vehicles and their trailers, and of systems, components and separate technical units intended for such vehicles (Framework Directive) (OJ L 263, 9.10.2007, p. 1).
HAS ADOPTED THIS DECISION:

Article 1 Approval
The technology used in the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter is approved as an innovative technology within the meaning of Article 12 of Regulation (EU) No 510/2011 provided the innovative technology is fitted in internal combustion engine powered N1 vehicles, or in hybrid N1 vehicles for which the conditions specified in point 6.3.2(2) or (3) of Annex 8 to UNECE Regulation 101 are fulfilled.

Article 2 Definitions
For the purpose of this Decision, 48V motor generator means a reversible machine that may operate as either an electric motor converting electrical energy into mechanical energy, or a generator converting mechanical energy into electrical energy as a standard alternator. This Decision focus on the generation function of the component.

Article 3 Application for certification of CO2 savings
1. A manufacturer may apply for certification of the CO2 savings from one or several SEG Automotive Germany GmbH High efficient 48V motor generators (BRM) plus 48V/12V DC/DC converters intended for use in N1 vehicles that comply with the conditions set out in Article 1.
2. An application for the certification of the savings from one or several SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter shall be accompanied by an independent verification report confirming that the CO2 savings threshold of 1gCO2/km specified in Article 9 of Implementing Regulation (EU) No 427/2014 is met.
3. The type approval authority shall reject the application for certification if it finds that the motor generator plus converter or motor generators plus converters are fitted in vehicles that do not comply with the conditions set out in Article 1, or where the CO2 emission savings are below the threshold specified in Article 9(1) of Implementing Regulation (EU) No 427/2014.

Article 4 Certification of CO2 savings
1. The reduction in CO2 emissions from the use of a SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter shall be determined using one of the two methodologies set out in the Annex.
2. Where a manufacturer applies for the certification of the CO2 savings from more than one SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus 48V/12V DC/DC converter in relation to one vehicle version, the type approval authority shall determine which of the motor generators plus converters tested delivers the lowest CO2 savings, and record those savings in the relevant type approval documentation. That value shall also be indicated in the certificate of conformity in accordance with Article 11(2) of Implementing Regulation (EU) No 427/2014.
3. The type approval authority shall record the verification report and the test results on the basis of which the savings were determined and shall make that information available to the Commission on request.

Article 5 Eco-innovation code
The eco-innovation code No 26 shall be entered into the type approval documentation where reference is made to this Decision in accordance with Article 11(1) of Implementing Regulation (EU) No 427/2014.

Article 6 Applicability
This Decision shall apply until 31 December 2020.

Article 7 Entry into force
This Decision shall enter into force on the twentieth day following that of its publication in the Official Journal of the European Union.
Done at Brussels, 21 February 2019.
For the Commission
The President
Jean-Claude Juncker

ANNEX Methodology to determine the CO2 savings of the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM) plus the 48V/12V DC/DC converter fitted in vehicles in compliance with the conditions set out in Article 1

1. INTRODUCTION
In order to determine the CO2 emission reductions that can be attributed to the use of the generation function of the SEG Automotive Germany GmbH High efficient 48V motor generator (BRM), hereinafter referred to as 48 V motor generator or motor generator, plus the 48V/12V DC/DC converter, for use in vehicles in compliance with the conditions set out in Article 1, it is necessary to specify the following:
(1) The test conditions;
(2) The test equipment;
(3) The procedure to determine the total efficiency;
(4) The procedure to determine the CO2 savings;
(5) The procedure to determine the uncertainty of the CO2 savings.
Two alternative methods can be used to determine the CO2 savings. The methods are described as follows.

2. SYMBOLS, PARAMETERS AND UNITS

Latin symbols

CCO2
CO2 savings [g CO2/km]

CO2
Carbon dioxide

CF
Conversion factor (l/100 km) - (g CO2/km) [gCO2/l] as defined in Table 3

h
Frequency as defined in Table 1

i
Number of operating points

I
Current intensity at which the measurement shall be carried out [A]

l
Number of measurement of the sample for the 48V/12V DC/DC converter

m
Number of measurement of the sample for the 48V motor generator

M
Torque [Nm]

n
Rotational frequency [min– 1] as defined in Table 1

P
Power [W]

sηDCDC–
Standard deviation of the 48V/12V DC/DC converter efficiency mean [%]

sηMG
Standard deviation of the 48V motor generator efficiency [%]

sηMG–
Standard deviation of the 48V motor generator efficiency mean [%]

sηTOT
Standard deviation of the total efficiency [%]

sCCO2
Standard deviation of the total CO2 savings [g CO2/km]

U
Test voltage at which the measurement shall be carried out [V]

v
Mean driving speed of the New European Driving Cycle (NEDC) [km/h]

VPe
Consumption of effective power [l/kWh] as defined in Table 2

Greek symbols

Δ
Difference

ηB
Baseline alternator efficiency [%]

ηDCDC
48V/12V DC/DC converter efficiency [%]

ηDC∕DC–
Mean of the 48V/12V DC/DC converter efficiency [%]

ηMG
48V motor generator efficiency [%]

ηMGi–
Mean of the 48V motor generator efficiency at operating point i [%]

ηTOT
Total efficiency [%]

Subscripts
Index (i) refers to operating point
Index (j) refers to measurement of the sample

MG
Motor generator

m
Mechanical

RW
Real-world conditions

TA
Type approval (NEDC) conditions

B
Baseline

3. METHOD 1 (‘SEPARATE METHOD’)

3.1. Efficiency of the 48V motor generator
The efficiency of the 48V motor generator shall be determined in accordance with ISO 8854:2012, with the exception of the elements specified in this section.
Evidence shall be provided to the type approval authority that the rotational frequency ranges of the efficient 48V motor generator are consistent with those set out in Table 1. The measurements shall be conducted at different operating points, as set out in Table 1. The efficient 48V motor generator current intensity shall be defined as half of the rated current for all operating points. For each rotational frequency, the voltage and the output current of the motor generator shall be kept constant, the voltage at 52V.

Table 1
Operating points
Operating pointi	Holding time[s]	Rotational frequencyni [min– 1]	Frequencyhi
1	1 200	1 800	0,25
2	1 200	3 000	0,40
3	600	6 000	0,25
4	300	10 000	0,10
The efficiency at each operating point shall be calculated in accordance with Formula 1:
Formula 1
ηMGi=60×Ui×Ii2π×Mi×ni×100
All efficiency measurements are to be performed consecutively at least five (5) times. The average of the measurements at each operating point (
ηMGi–
) shall be calculated.
The efficiency of the generation function (ηMG) shall be calculated in accordance with the following Formula 2:
Formula 2
ηMG=∑i=14 hi×ηMGi–

3.2. Efficiency of the 48V/12V DC/DC converter
The efficiency of the 48V/12V DC/DC converter shall be determined under the following conditions:
Output voltage of 14,3 V
Output current of nominal power of the 48V/12V DC/DC converter divided by 14,3 V
The nominal power of the 48V/12V DC/DC converter shall be the continuous output power at the 12V side guaranteed by the manufacturer of the DC/DC converter at the conditions specified in the ISO 8854:2012.
The efficiency of the 48V/12V DC/DC converter shall be measured at least five (5) times consecutively. The average of all the measurements (
ηDC∕DC–
) shall be calculated and used for the calculations laid down in paragraph 3.3.

3.3. Total efficiency and saved mechanical power
The total efficiency of the 48 V motor generator plus the 48V/12V DC/DC converter shall be calculated using Formula 3:
Formula 3
ηTOT=ηMG×ηDC∕DC–
The 48 V motor generator plus the 48V/12V DC/DC converter generation function lead to saved mechanical power under real-world conditions (ΔPmRW) and type approval NEDC conditions (ΔPmTA) as set out in Formula 4.
Formula 4
ΔPm = ΔPmRW – ΔPmTA
Where the saved mechanical power under real-world conditions (ΔPmRW) shall be calculated in accordance with Formula 5 and the saved mechanical power under type-approval NEDC conditions (ΔPmTA) in accordance with Formula 6:
Formula 5
ΔPmRW=PRWηB−PRWηTOT
Formula 6
ΔPmTA=PTAηB−PTAηTOT
where

PRW
Power requirement under ‘real-world’ conditions [W], which is estimated at 750W

PTA
Power requirement under NEDC type-approval conditions [W], which is estimated at 350W

ηB
Efficiency of the baseline alternator [%], which is 67 %

3.4. Calculation of the CO2 savings
The CO2 savings of the 48 V motor generator plus the 48V/12V DC/DC converter shall be calculated in accordance with Formula 7:
Formula 7
CCO2=ΔPm×VPe×CFv
where

v
Mean driving speed of the NEDC [km/h], which is 33,58 km/h

VPe
Consumption of effective power specified in Table 2:

Table 2
Consumption of effective power
Type of engine	Consumption of effective power (VPe)[l/kWh]
Petrol	0,264
Petrol Turbo	0,280
Diesel	0,220

CF
Conversion factor (l/100 km) - (g CO2/km) [gCO2/l] as defined in Table 3

Table 3
Fuel conversion factor
Type of fuel	Conversion factor (l/100 km) - (g CO2/km) (CF)[gCO2/l]
Petrol	2 330
Diesel	2 640

3.5. Calculation of the statistical margin
The statistical margin of the results of the testing methodology caused by the measurements shall be quantified. For each operating point the standard deviation shall be calculated in accordance with Formula 8:
Formula 8
sηMGi–=sηMGim=∑mj=1ηMGij−ηMGi–2mm−1
The standard deviation of the efficiency value of the efficient 48V motor generator (
sηMG
) shall be calculated in accordance with Formula 9:
Formula 9
sηMG=∑i=14hi×sηMGi–2
The standard deviation of the efficiency value of the 48V/12V DC/DC converter (
sηDC∕DC–
) shall be calculated in accordance with Formula 10:
Formula 10
sηDC∕DC–=∑1j=1ηDC∕DCij−ηDC∕DCi–2ll−1
The standard deviation of the motor generator efficiency (
sηMG
) and of the 48V/12V DC/DC converter (
sηDC∕DC–
) lead to an uncertainty in the CO2 savings (
sCCO2
). That uncertainty is calculated in accordance with Formula 11:
Formula 11
sCCO2=PRW−PTAηTOT×VPe×CFv×sηMGηMG2+sηDC∕DC–ηDC∕DC–2

4. METHOD 2 (‘COMBINED METHOD’)

4.1. Efficiency of the 48V motor generator plus the 48V/12V DC/DC converter
The efficiency of the 48V motor generator plus the 48V/12V DC/DC converter shall be determined in accordance with ISO 8854:2012, with the exception of the elements specified in this section.
Evidence shall be provided to the type approval authority that the speed ranges of the efficient 48V motor generator are consistent with those set out in Table 1.
The measurements shall be conducted at different operating points, as set out in Table 1. The efficient 48V motor generator plus the 48V/12V DC/DC converter current intensity shall be defined as half of the rated current of the 48V/12V DC/DC converter for all operating points.
The rated current of the 48V/12V DC/DC converter is defined as the output nominal power of the 48V/12V DC/DC converter divided by 14,3 V. The nominal power of the 48V/12V DC/DC converter shall be the continuous output power at the 12V side guaranteed by the manufacturer of the DC/DC converter at the conditions specified in the ISO 8854:2012.
For each speed the voltage and the output current of the motor generator shall be kept constant, the voltage at 52 V.
The efficiency at each operating point shall be calculated in accordance with Formula 12:
Formula 12
ηTOTi=60×Ui×Ii2π×Mi×ni×100
All efficiency measurements are to be performed consecutively at least five (5) times. The average of the measurements at each operating point (
ηTOTi–
) shall be calculated.
The efficiency of the generation function (ηTOT) shall be calculated in accordance with Formula 13:
Formula 13
ηTOT=∑i=14 hi×ηTOTi–
The measurement set up has to allow the measurement of the 48V motor generation efficiency alone.

4.2. Demonstration of conservativeness of the 48V motor generator plus 48V/12V DC/DC converter efficiency determination
In order to use the procedure specified in 4.1 for the determination of ηTOT, it has to be demonstrated that the efficiency of the 48V motor generator alone obtained with the conditions specified in 4.1 is lower than the efficiency obtained with the conditions specified in 3.1.

4.3. Saved mechanical power
The 48 V motor generator plus the 48V/12V DC/DC converter generation function lead to saved mechanical power under real-world conditions (ΔPmRW) and type approval conditions (ΔPmTA) as set out in Formula 14.
Formula 14
ΔPm = ΔPmRW – ΔPmTA
Where the saved mechanical power under real-world conditions (ΔPmRW) shall be calculated in accordance with Formula 15 and the saved mechanical power under type-approval conditions (ΔPmTA) in accordance with Formula 16:
Formula 15
ΔPmRW=PRWηB−PRWηTOT
Formula 16
ΔPmTA=PTAηB−PTAηTOT
where

PRW
Power requirement under ‘real-world’ conditions [W], which is estimated at 750W

PTA
Power requirement under type-approval NEDC conditions [W], which is estimated at 350W

ηB
Efficiency of the baseline alternator [%], which is 67 %

4.4. Calculation of the CO2 savings
The CO2 savings of the 48 V motor generator plus the 48V/12V DC/DC converter shall be calculated in accordance with Formula 17:
Formula 17
CCO2=ΔPm×VPe×CFv
where

v
Mean driving speed of the NEDC [km/h], which is 33,58 km/h

VPe
Consumption of effective power specified in Table 2

CF
Conversion factor (l/100 km) - (g CO2/km) [gCO2/l] as defined in Table 3

4.5. Calculation of the statistical margin
The statistical margin of the results of the testing methodology caused by the measurements shall be quantified. For each operating point the standard deviation shall be calculated in accordance with Formula 18:
Formula 18
sηTOTi–=sηTOTim=∑mj=1ηTOTij−ηTOTi–2mm−1
The standard deviation of the efficiency value of the efficient 48V motor generator plus the 48V/12V DC/DC converter (
sηTOT
) shall be calculated in accordance with Formula 19:
Formula 19
sηTOT=∑i=14hi×sηTOTi–2
The standard deviation of the motor generator and of the 48V/12V DC/DC converter efficiency leads to an uncertainty in the CO2 savings (
sCCO2
). That uncertainty is calculated in accordance with Formula 20:
Formula 20
sCCO2=PRW−PTAηTOT2×VPe×CFv×sηTOT

5. ROUNDING
The calculated CO2 savings value (
CCO2
) and the statistical margin of the CO2 saving (
sCCO2
) must be rounded to a maximum of two decimal places.
Each value used in the calculation of the CO2 savings can be applied unrounded or must be rounded to the minimum number of decimal places which allows the maximum total impact (i.e. combined impact of all rounded values) on the savings to be lower than 0,25 gCO2/km.

6. STATISTICAL SIGNIFICANCE (for both methods)
It shall be demonstrated for each type, variant and version of a vehicle fitted with the efficient 48V motor generator that the uncertainty of the CO2 savings calculated in accordance with Formula 7 or Formula 17 is not greater than the difference between the total CO2 savings and the minimum savings threshold specified in Article 9(1) of Commission Implementing Regulation (EU) No 725/2011 and Implementing Regulation (EU) No 427/2014 (see Formula 21).
Commission Implementing Regulation (EU) No 725/2011 of 25 July 2011 establishing a procedure for the approval and certification of innovative technologies for reducing CO2 emissions from passenger cars pursuant to Regulation (EC) No 443/2009 of the European Parliament and of the Council (OJ L 194, 26.7.2011, p. 19).
Formula 21
MT<CCO2−sCCO2−ΔCO2m
Where:

MT
minimum threshold [g CO2/km]

CCO2
total CO2 saving [g CO2/km]

sCCO2
standard deviation of the total CO2 saving [gCO2/km]

ΔCO2m
CO2 correction coefficient due to the positive mass difference between the efficient 48V motor generator plus 48V/12V DC-DC converter and the baseline alternator. For
ΔCO2m
the data in Table 4 is to be used.

Table 4
CO2 correction coefficient due to the extra mass
Type of fuel	CO2 correction coefficient due to the positive mass difference ( ΔCO2m )[g CO2/km]
Petrol	0,0277 · Δm
Diesel	0,0383 · Δm
Δm (in Table 4) is the extra mass due to the installation of the 48V motor generator and the 48V/12V DC-DC converter. It is the positive difference between the mass of the 48V motor generator plus the 48V/12V DC-DC converter and the mass of baseline alternator. The mass of the baseline alternator is 7 kg. The extra mass is to be verified and confirmed in the verification report to be submitted to the type approval authority together with the application for certifications.