ANNEX I
No	Reference of the standard
1.	EN ISO 13766-1:2018 Earth-moving and building construction machinery — Electromagnetic compatibility (EMC) of machines with internal electrical power supply — Part 1: General EMC requirements under typical electromagnetic environmental conditions (ISO 13766-1:2018)
2.	EN 55035:2017 Electromagnetic compatibility of multimedia equipment — Immunity requirements
3.	EN 61000-6-5:2015 Electromagnetic compatibility (EMC) — Part 6-5: Generic standards — Immunity for equipment used in power station and substation environment EN 61000-6-5:2015/AC:2018-01
4.	EN IEC 61058-1:2018 Switches for appliances — Part 1: General requirements
5.	EN 63024:2018 Requirements for automatic reclosing devices (ARDs) for circuit-breakers, RCBOs and RCCBs for household and similar uses (IEC 63024:2017, modified)
6.	EN IEC 60947-4-1:2019 Low-voltage switchgear and controlgear - Part 4-1: Contactors and motor-starters - Electromechanical contactors and motor-starters
7.	EN IEC 60947-9-1:2019 Low-voltage switchgear and controlgear - Part 9-1: Active arc-fault mitigation systems - Arc quenching devices
8.	EN 61439-3:2012 Low-voltage switchgear and controlgear assemblies - Part 3: Distribution boards intended to be operated by ordinary persons (DBO) EN 61439-3:2012/AC:2019-04
9.	EN 12895:2015+A1:2019 Industrial trucks - Electromagnetic compatibility
Inserted by Commission Implementing Decision (EU) 2020/660 of 15 May 2020 amending Implementing Decision (EU) 2019/1326 as regards the electromagnetic compatibility of electromechanical contactors and motor-starters, arc quenching devices, distribution boards intended to be operated by ordinary persons and industrial trucks.