Technical specifications for the Copernicus service component
Article 1
The following technical specifications for the Copernicus service component referred to in Article 5(1) of Regulation (EU) No 377/2014, regarding its implementation, are hereby adopted:
1. General characteristics of the Copernicus service component, as set out in Annex I to this Decision;
2. Technical specifications for the Copernicus atmosphere monitoring service referred to in Article 5(1)(a) of Regulation (EU) No 377/2014, as set out in Annex II to this Decision;
3. Technical specifications for the Copernicus marine environment monitoring service referred to in Article 5(1)(b) of Regulation (EU) No 377/2014, as set out in Annex III to this Decision;
4. Technical specifications for the Copernicus land monitoring service referred to in Article 5(1)(c) of Regulation (EU) No 377/2014, as set out in Annex IV to this Decision;
5. Technical specifications for the Copernicus climate change service referred to in Article 5(1)(d) of Regulation (EU) No 377/2014, as set out in Annex V to this Decision;
6. Technical specifications for the Copernicus emergency management service referred to in Article 5(1)(e) of Regulation (EU) No 377/2014, as set out in Annex VI to this Decision;
7. Technical specifications for the Copernicus security service referred to in Article 5(1)(f) of Regulation (EU) No 377/2014, as set out in Annex VII to this Decision.