Article 1
Decision 2011/72/CFSP is amended as follows:
1. Article 5 is replaced by the following:
Article 5
This Decision shall apply until 31 January 2019. It shall be kept under constant review. It may be renewed or amended, as appropriate, if the Council deems that its objectives have not been met.
;
2. the Annex is amended as set out in the Annex to this Decision.