Article 1
In Article 13(1) of Decision 2012/389/CFSP, the following subparagraph is added:
The financial reference amount intended to cover the expenditure related to EUCAP Somalia for the period from 1 March 2017 to 28 February 2018 shall be EUR 22 950 000.
.