Imposition of corrective measures
Article 6
1
In accordance with Article 22(2) and (3) of Regulation (EU) No 795/2014 (ECB/2014/28), the competent authority may impose corrective measures on a SIPS operator, after taking into account the information provided by the latter. For the avoidance of doubt, where the procedure to impose a corrective measure has been initiated on the basis of suspected non-compliance, a corrective measure shall be imposed only after the relevant decision-making body of the competent authority has endorsed the report identifying non-compliance.
2
Where the ECB acts as a competent authority, a decision to impose corrective measures shall be endorsed by the Governing Council. The decision shall specify the time limit within which the SIPS operator has to implement the corrective measures.
3
Where an NCB acts as a competent authority, a decision to impose corrective measures shall be endorsed by the NCB's decision-making body. The decision shall specify the time limit within which the SIPS operator has to implement the corrective measures. The NCB shall submit a copy of the decision to the Governing Council for information without undue delay.