Other Union rapid alert and information systems
Article 3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.9.2021) by The Health Security (EU Exit) Regulations 2021 (S.I. 2021/877), regs. 1(1), 15(c)