Article 1
In Article 14(1) of Decision 2014/486/CFSP, the fifth and sixth subparagraphs are replaced by the following:
The financial reference amount intended to cover the expenditure related to EUAM Ukraine for the period from 1 December 2017 to 31 May 2019 shall be EUR 33 843 302,49.
.