Article 1
In Article 9 of Decision 2010/788/CFSP, paragraph 2 is replaced by the following:
2.
The measures referred to in Article 3(2) shall apply until 12 December 2018. They shall be renewed, or amended as appropriate, if the Council deems that their objectives have not been met.
.