Commission Decision (EU) 2017/175
of 25 January 2017
on establishing EU Ecolabel criteria for tourist accommodation
(notified under document C(2017) 299)
(Text with EEA relevance) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Environment (Amendment etc.) (EU Exit) Regulations 2019 (S.I. 2019/458), reg. 1(1), Sch. para. 40; 2020 c. 1, Sch. 5 para. 1(1)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 10 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX FRAMEWORK

EU ECOLABEL CRITERIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Mandatory criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General management criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Energy criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Water criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Waste and wastewater criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Other criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Optional criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

General management criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 23. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 24. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 25. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 26. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 27 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Energy criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 28. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 29. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 30. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 31. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 32. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 33. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 34. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 35. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 36. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 37. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 38. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 39. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 40. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 41. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Water criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 42. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 43. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 44. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 45. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 46. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 47. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 48. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 49. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 50. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Waste and waste water criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 51. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 52. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 53. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 54. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 55. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 56. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 57. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 58. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 59. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Other criteria
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 60. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 61. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 62. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 63. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 64. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 65. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 66. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Criterion 67. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ASSESSMENT AND VERIFICATION
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SECTION A CRITERIA REFERRED TO IN ARTICLE 3(a)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GENERAL MANAGEMENT
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 1. Basis of an Environmental Management System
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 2. Staff training
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 3. Information to guests
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 4. General maintenance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 5. Consumption monitoring
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ENERGY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 6. Energy efficient space heating and water heating appliances
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 7. Energy efficient air conditioning and air-based heat pumps appliances
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 8. Energy efficient lighting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 9. Thermoregulation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 10. Automatic switching off of HVAC and lighting
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 11. Outside heating and air conditioning appliances
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 12. Procurement of electricity from a renewable electricity supplier
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 13. Coal and heating oils
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

WATER
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 14. Efficient water fittings: Bathroom taps and showers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 15. Efficient water fittings: toilets and urinals
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 16. Reduction in laundry achieved through reuse of towels and bedclothes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

WASTE AND WASTEWATER
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 17. Waste prevention: food service waste reduction plan
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 18. Waste prevention: Disposable items
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 19. Waste sorting and sending for recycling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

OTHER CRITERIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 20. No smoking in common areas and rooms
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 21. Promotion of environmentally preferable means of transport
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 22. Information appearing on the EU Ecolabel
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

SECTION B CRITERIA REFERRED TO IN ARTICLE 3(b)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

GENERAL MANAGEMENT
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 23. EMAS registration, ISO certification of the tourist accommodation (up to 5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 24. EMAS registration or ISO certification of suppliers (up to 5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 25. Ecolabelled services (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 26. Environmental and social communication and education (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 27. Consumption monitoring: Energy and water sub-metering (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ENERGY
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 28. Energy efficient space heating and water heating appliances (up to 3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 29. Energy efficient air conditioning and air-based heat pumps appliances (up to 3,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 30. Air-based heat pumps up to 100 kW heat output (3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 31. Energy efficient household appliances and lighting (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 32. Heat recovery (up to 3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 33. Thermoregulation and window insulation (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 34. Automatic switch off of appliances/devices (up to 4,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 35. District heating/cooling and cooling from cogeneration (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 36. Electric hand driers with proximity sensor (1 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 37. Space Heater emissions (1,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 38. Procurement of electricity from a renewable electricity supplier (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 39. On site self-generation of electricity through renewable energy sources (up to 5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 40. Heating energy from renewable energy sources (up to 3,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 41. Swimming pool heating (up to 1,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

WATER
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 42. Efficient water fittings: Bathroom taps and showers (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 43. Efficient water fittings: Toilets and urinals (up to 4,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 44. Dishwasher water consumption (2,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 45. Washing machine water consumption (3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 46. Indications on water hardness (up to 1,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 47. Optimised pool management (up to 2,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 48. Rainwater and grey water recycling (up to 3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 49. Efficient irrigation (1,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 50. Native or non-invasive alien species used in outdoor planting (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

WASTE AND WASTEWATER
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 51. Paper products (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 52. Durable goods (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 53. Beverages provision (2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 54. Detergents and toiletries procurement (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 55. Minimisation of the use of cleaning products (1,5 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 56. De-icing (1 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 57. Used textiles and furniture (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 58. Composting (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 59. Waste water treatment (up to 3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

OTHER CRITERIA
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 60. No smoking in rooms (1 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 61. Social policy (up to 2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 62. Maintenance vehicles (1 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 63. Environmentally preferable means of transport offer (up to 2,5 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 64. Unsealed surfaces (1 point)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 65. Local and organic products (up to 4 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 66. Pesticide avoidance (2 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Criterion 67. Additional environmental and social actions (up to 3 points)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Assessment and verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .