Commission Implementing Decision (EU) 2017/1207
of 4 July 2017
renewing the authorisation for the placing on the market of genetically modified maize MON 810 (MON-ØØ81Ø-6) products pursuant to Regulation (EC) No 1829/2003 of the European Parliament and of the Council
(notified under document C(2017) 4453)
(Only the Dutch and French texts are authentic)
(Text with EEA relevance) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Genetically modified organism and unique identifier
Article 1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Renewal of the authorisation
Article 2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Labelling
Article 3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Monitoring for environmental effects
Article 4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Community register
Article 5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Authorisation holder
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Validity
Article 7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Addressee
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX
(a)

Applicant and authorisation holder:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(b)

Designation and specification of the products:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(c)

Labelling:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(d)

Method for detection:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(e)

Unique identifier:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(f)

Information required under Annex II to the Cartagena Protocol on Biosafety to the Convention on Biological Diversity:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(g)

Conditions or restrictions on the placing on the market, use or handling of the products:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(h)

Monitoring plan for environmental effects:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
(i)

Post-market monitoring requirements for the use of the food for human consumption:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (E.W.S) (1.4.2025) by The Food and Feed (Regulated Products) (Amendment, Revocation, Consequential and Transitional Provision) Regulations 2025 (S.I. 2025/361), reg. 1(2), Sch. 6 para. 44 (with reg. 23)