CHAPTER 1
GENERAL PROVISIONS
Article 1
Definition
Article 2
Subject matter and scope
Article 3
Alert state levels
Article 4
Responsibilities
Article 5
Measures
CHAPTER 2
MISCELLANEOUS AND FINAL PROVISIONS
Article 6
Transparency
Article 7
Repeal
Article 8
Entry into force
Commission Decision (EU, Euratom) 2016/883
of 31 May 2016
on implementing rules for standard security measures, alert states and management of crisis situations in the Commission pursuant to Article 21 of Decision (EU, Euratom) 2015/443 on security in the Commission (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The European Institutions and Consular Protection (Amendment etc.) (EU Exit) Regulations 2018 (S.I. 2018/1391), reg. 1, Sch.; 2020 c. 1, Sch. 5 para. 1(1)