Article 1
The State aid which Germany is planning to implement in favour of BMW AG’s investment in Leipzig, amounting to EUR 45 257 273 is compatible with the internal market only if it is limited to an amount of EUR 17 million (in prices of 2009); the exceeding amount (EUR 28 257 273) is incompatible with the internal market.
The aid may accordingly only be implemented up to the amount of EUR 17 million.