Commission Implementing Decision (EU) 2016/578
of 11 April 2016
establishing the Work Programme relating to the development and deployment of the electronic systems provided for in the Union Customs Code (repealed) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Customs (Revocation of Retained Direct EU Legislation, etc.) (EU Exit) Regulations 2019 (S.I. 2019/698), reg. 1(2), Sch. para. 39; 2020 c. 1, Sch. 5 para. 1(1)

Article 1 The work programme
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 2 Implementation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 3 Updates
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 4 Communication and Governance
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 5 Repeal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Article 6 Entry into force
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX The work programme relating to the development and deployment of the electronic systems provided for in the Union Customs Code

I. INTRODUCTION TO THE WORK PROGRAMME
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. The Work Programme establishes the following ‘dates of the deployment’ of the trans-European and national systems:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. For purely national systems or specific national components of a wider Union project, the Member States may decide on the ‘dates of deployment’ as well as on the start date and on the end date of a deployment window in accordance with their national project planning.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. For trans-European systems with an actual deployment window without a single implementation date, the Member States may start the deployment at an appropriate date within this window and may allow a time-period for the economic operators to migrate within this deployment window, where such time-period is deemed appropriate. The start and end dates shall be communicated to the Commission. Careful examination of the common domain aspects will need to be considered.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. In view of the implementation of the Work Programme, the Commission and the Member States will need to manage carefully the complexity in terms of dependencies, variables and assumptions. The principles set out in the MASP will be used to manage the planning.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

II. LIST OF PROJECTS RELATED TO THE DEVELOPMENT AND DEPLOYMENT OF ELECTRONIC SYSTEMS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

A. Full list
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

B. Overview of the list
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .