Article 4 Individual aid granted under the scheme referred to in Article 1(1) which fulfils the conditions laid down by a regulation adopted pursuant to Article 1 of Regulation (EC) No 994/98 and applicable at the time the aid was granted or by any other approved aid scheme is compatible with the internal market.