Article 3 Aid granted in individual cases under the measures referred to in Article 1 which, at the time it is granted, fulfils the conditions laid down by a Regulation adopted pursuant to Article 1 of Regulation (EC) No 994/98, or by any other approved aid scheme, is compatible with the internal market up to the maximum aid intensity applicable to that type of aid.