Article 1
The investment subsidies granted by France to Marseille Provence Airport in the amount of EUR 12,337 million are State aid compatible with the internal market pursuant to Article 107(3)(c) TFEU.
The airport tax payable to the airport, the transfers between the airport and the CCIMP, the reduced charges for airlines using the airport, and the marketing agreement with AMS granted by France do not constitute State aid within the meaning of Article 107(1) TFEU.