Article 1
The infrastructure measures implemented by Germany do not constitute dedicated infrastructure for Propapier PM2 GmbH. The fees charged by TAZV to Propapier for the use of the waste water treatment plant do not involve State aid. Therefore, the infrastructure measures and fee setting rules do not constitute aid within the meaning of Article 107(1) of the Treaty on the Functioning of the European Union.