Council Decision (CFSP) 2015/2275
of 7 December 2015
amending Decision 2012/389/CFSP on the European Union Mission on Regional Maritime Capacity Building in the Horn of Africa (EUCAP NESTOR)

THE COUNCIL OF THE EUROPEAN UNION,
Having regard to the Treaty on European Union, and in particular Article 28 and Articles 42(4) and 43(2) thereof,
Having regard to the proposal from the High Representative of the Union for Foreign Affairs and Security Policy,
Whereas:
(1) On 16 July 2012, the Council adopted Decision 2012/389/CFSP on the European Union Mission on Regional Maritime Capacity Building in the Horn of Africa (EUCAP NESTOR).
Council Decision 2012/389/CFSP of 16 July 2012 on the European Union Mission on Regional Maritime Capacity Building in the Horn of Africa (EUCAP NESTOR) (OJ L 187, 17.7.2012, p. 40).
(2) On 22 July 2014, the Council adopted Decision 2014/485/CFSP extending EUCAP NESTOR until 12 December 2016.
Council Decision 2014/485/CFSP of 22 July 2014 amending Decision 2012/389/CFSP on the European Union Mission on Regional Maritime Capacity Building in the Horn of Africa (EUCAP NESTOR) (OJ L 217, 23.7.2014, p. 39).
(3) On 6 October 2015, the Council adopted Decision (CFSP) 2015/1793 extending the period covered by the financial reference amount until 15 December 2015.
Council Decision (CFSP) 2015/1793 of 6 October 2015 amending Decision 2012/389/CFSP on the European Union Mission on Regional Maritime Capacity Building in the Horn of Africa (EUCAP NESTOR) (OJ L 260, 7.10.2015, p. 30).
(4) Decision 2012/389/CFSP should be amended to provide for a financial reference amount for the period from 16 December 2015 to 12 December 2016,
HAS ADOPTED THIS DECISION:

Article 1 Article 13(1) of Decision 2012/389/CFSP is replaced as follows:

‘1. The financial reference amount intended to cover the expenditure related to EUCAP NESTOR for the period from 16 July 2012 to 15 November 2013 shall be EUR 22 880 000.
The financial reference amount intended to cover the expenditure related to EUCAP NESTOR for the period from 16 November 2013 to 15 October 2014 shall be EUR 11 950 000.
The financial reference amount intended to cover the expenditure related to EUCAP NESTOR for the period from 16 October 2014 to 15 December 2015 shall be EUR 17 900 000.
The financial reference amount intended to cover the expenditure related to EUCAP NESTOR for the period from 16 December 2015 to 12 December 2016 shall be EUR 12 000 000.’.

Article 2 This Decision shall enter into force on the date of its adoption.
Done at Brussels, 7 December 2015.
For the Council
The President
C. Cahen