Article 1
Decision 2014/486/CFSP is hereby amended as follows:
1. In Article 14(1), the following subparagraph is added:
The financial reference amount intended to cover the expenditure related to EUAM Ukraine for the period from 1 December 2015 to 30 November 2016 shall be EUR 14 400 000.
.
2. In Article 19, the second paragraph is replaced by the following:
It shall apply until 30 November 2017.
.