Financial provisions
Article 17
1
The financial envelope for the implementation of the ISA2 programme for the period of its application shall be EUR 130 928 000.
2
The annual appropriations shall be authorised by the European Parliament and the Council within the limits of the multiannual financial framework.
3
The financial allocation for the ISA2 programme may also cover expenses pertaining to preparatory, monitoring, checking, audit and evaluation activities which are required on a regular basis for the management of the programme and the achievement of its objectives.