Commission Implementing Decision
of 7 October 2014
amending Decision 2007/131/EC on allowing the use of the radio spectrum for equipment using ultra-wideband technology in a harmonised manner in the Community
(notified under document C(2014) 7083)
(2014/702/EU) (revoked)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Radio Spectrum (EU Exit) Regulations 2018 (S.I. 2018/1385), reg. 1, Sch. 2 para. 34; 2020 c. 1, Sch. 5 para. 1(1)

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

1. GENERIC UWB USAGE
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. LOCATION TRACKING SYSTEMS TYPE 1 (LT1)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. UWB DEVICES INSTALLED IN ROAD AND RAIL VEHICLES
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. UWB ONBOARD AIRCRAFT
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. MATERIAL SENSING DEVICES USING UWB TECHNOLOGY

5.1. Material sensing devices
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2. Building material analysis devices (BMA)

1. BMA Devices permitted under this Decision shall fulfil the following requirements:
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Emissions radiating from BMA devices shall be kept to a minimum and in any case not exceed the maximum power limits within the table below with the BMA device on a representative wall as defined within ETSI Standards EN 302 435-1 and EN 302 498-2.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .