Article 1
1
The following measures constitute State aid:
a
the recapitalisation in the amount of EUR 900 million under the bank support scheme;
b
the recapitalisation in the amount of EUR 450 million under the bank support scheme;
c
the guarantees of EUR 1,35 billion under the bank support scheme;
d
the asset guarantee of EUR 100 million;
e
the asset guarantee of EUR 200 million;
f
the recapitalisation in the amount of EUR 500 million;
g
the State guarantee on subordinated Tier-2 capital instruments with a nominal value of EUR 1 billion;
h
the contingent capital for the wind-up of HGAA up to a maximum amount of EUR 5,4 billion;
i
The contingent liquidity support up to a maximum amount of EUR 3,3 billion.
2
The State aid referred to in paragraph 1 is compatible with the internal market, in the light of the commitments set out in the Annex.