Article 1 1. The following measures constitute State aid:
(a) the recapitalisation in the amount of EUR 900 million under the bank support scheme;
(b) the recapitalisation in the amount of EUR 450 million under the bank support scheme;
(c) the guarantees of EUR 1,35 billion under the bank support scheme;
(d) the asset guarantee of EUR 100 million;
(e) the asset guarantee of EUR 200 million;
(f) the recapitalisation in the amount of EUR 500 million;
(g) the State guarantee on subordinated Tier-2 capital instruments with a nominal value of EUR 1 billion;
(h) the contingent capital for the wind-up of HGAA up to a maximum amount of EUR 5,4 billion;
(i) The contingent liquidity support up to a maximum amount of EUR 3,3 billion.
2. The State aid referred to in paragraph 1 is compatible with the internal market, in the light of the commitments set out in the Annex.