Article 1
In Article 2 of Decision 2006/771/EC, the following point is...
Article 2
Article 3 of Decision 2006/771/EC is replaced by the following....
Article 3
The Annex to Decision 2006/771/EC is replaced by the text...
Article 4
Decision 2005/928/EC is repealed.
Article 5
Member States shall report to the Commission on the implementation...
Article 6
This Decision is addressed to the Member States.
ANNEX
‘ANNEX Harmonised frequency bands and technical parameters for short-range devices...
Commission Implementing Decision
of 11 December 2013
amending Decision 2006/771/EC on harmonisation of the radio spectrum for use by short-range devices and repealing Decision 2005/928/EC
(notified under document C(2013) 8776)
(Text with EEA relevance)
(2013/752/EU) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (31.12.2020) by The Radio Spectrum (EU Exit) Regulations 2018 (S.I. 2018/1385), reg. 1, Sch. 2 para. 31; 2020 c. 1, Sch. 5 para. 1(1)