Sampling framework and collection of isolates ...
Article 2
1
The appropriate authority must ensure the sampling for the monitoring of AMR in accordance with the technical requirements set out in Part A of the Annex.
2
The appropriate authority must collect representative isolates of the following bacteria in accordance with the technical requirements set out in the part A of the Annex:
a
Salmonella spp.;
b
C. jejuni;
c
Indicator commensal E. coli; and
d
ESBL- or AmpC- or carbapenemase-producing Salmonella spp. and E. coli.
3
The appropriate authority may collect representative isolates of the following bacteria provided that they do so in accordance with the technical requirements set out in Part A of the Annex:
a
C. coli;
b
Indicator commensal E. faecalis and E. faecium.
Words in Art. 2 heading omitted (31.12.2020) by virtue of The Zoonotic Disease Eradication and Control (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/740), regs. 1, 11(3)(a); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 2(1) substituted (31.12.2020) by The Zoonotic Disease Eradication and Control (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/740), regs. 1, 11(3)(b); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 2(2) substituted (31.12.2020) by The Zoonotic Disease Eradication and Control (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/740), regs. 1, 11(3)(b); 2020 c. 1, Sch. 5 para. 1(1)
Words in Art. 2(3) substituted (31.12.2020) by The Zoonotic Disease Eradication and Control (Amendment) (EU Exit) Regulations 2019 (S.I. 2019/740), regs. 1, 11(3)(c); 2020 c. 1, Sch. 5 para. 1(1)