Decision No 1082/2013/EU of the European Parliament and of the Council
of 22 October 2013
on serious cross-border threats to health and repealing Decision No 2119/98/EC
(Text with EEA relevance) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER I

GENERAL PROVISIONS

Subject matter
Article 1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Scope
Article 2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Definitions
Article 3. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER II

PLANNING

Preparedness and response planning
Article 4. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Joint procurement of medical countermeasures
Article 5. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER III

EPIDEMIOLOGICAL SURVEILLANCE AND AD HOC MONITORING

Epidemiological surveillance
Article 6. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Ad hoc monitoring
Article 7. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER IV

EARLY WARNING AND RESPONSE

Establishment of an early warning and response system
Article 8. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Alert notification
Article 9. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Public health risk assessment
Article 10. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Coordination of response
Article 11. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER V

EMERGENCY SITUATIONS

Recognition of emergency situations
Article 12. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Legal effects of recognition
Article 13. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Termination of the recognition
Article 14. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER VI

PROCEDURAL PROVISIONS

Designation of national authorities and representatives
Article 15. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Protection of personal data
Article 16. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Health Security Committee
Article 17. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Committee procedure
Article 18. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Reports concerning this Decision
Article 19. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
CHAPTER VII

FINAL PROVISIONS

Repeal of Decision No 2119/98/EC
Article 20. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Entry into force
Article 21. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Addressees
Article 22. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX

Criteria for selection of communicable diseases and related special health issues to be covered by epidemiological surveillance within the network
1.. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2.. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
3.. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
4.. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
5.. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.9.2021) by The Health Security (EU Exit) Regulations 2021 (S.I. 2021/877), regs. 1(1), 15(b)