Decision No 1082/2013/EU of the European Parliament and of the Councilof 22 October 2013on serious cross-border threats to health and repealing Decision No 2119/98/EC(Text with EEA relevance) (revoked)
CHAPTER I
GENERAL PROVISIONS
Article 1
Subject matter
Article 2
Scope
Article 3
Definitions
CHAPTER II
PLANNING
Article 4
Preparedness and response planning
Article 5
Joint procurement of medical countermeasures
CHAPTER III
EPIDEMIOLOGICAL SURVEILLANCE AND AD HOC MONITORING
Article 6
Epidemiological surveillance
Article 7
Ad hoc monitoring
CHAPTER IV
EARLY WARNING AND RESPONSE
Article 8
Establishment of an early warning and response system
Article 9
Alert notification
Article 10
Public health risk assessment
Article 11
Coordination of response
CHAPTER V
EMERGENCY SITUATIONS
Article 12
Recognition of emergency situations
Article 13
Legal effects of recognition
Article 14
Termination of the recognition
CHAPTER VI
PROCEDURAL PROVISIONS
Article 15
Designation of national authorities and representatives
Article 16
Protection of personal data
Article 17
Health Security Committee
Article 18
Committee procedure
Article 19
Reports concerning this Decision
CHAPTER VII
FINAL PROVISIONS
Article 20
Repeal of Decision No 2119/98/EC
Article 21
Entry into force
Article 22
Addressees
ANNEX
Criteria for selection of communicable diseases and related special health issues to be covered by epidemiological surveillance within the network
1.
Communicable diseases and related special health issues that cause, or...
2.
Communicable diseases and related special health issues where the exchange...
3.
Rare and serious communicable related diseases and special health issues...
4.
Communicable diseases and related special health issues for which effective...
5.
Communicable diseases and related special health issues for which a...
Decision No 1082/2013/EU of the European Parliament and of the Council
of 22 October 2013
on serious cross-border threats to health and repealing Decision No 2119/98/EC
(Text with EEA relevance) (revoked)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Decision revoked (1.9.2021) by The Health Security (EU Exit) Regulations 2021 (S.I. 2021/877), regs. 1(1), 15(b)