Council Decision
of 19 December 2011
concerning the specific programme, to be carried out by means of direct actions by the Joint Research Centre, implementing the Framework Programme of the European Atomic Energy Community for nuclear research and training activities (2012-2013)
(2012/95/Euratom) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Council Regulation (Euratom) No 1314/2013 of 16 December 2013 on the Research and Training Programme of the European Atomic Energy Community (2014-2018) complementing the Horizon 2020 Framework Programme for Research and Innovation.

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

ANNEX SPECIFIC PROGRAMME OF THE JOINT RESEARCH CENTRE

1. Objective
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. Approach
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. Activities

3.1. Nuclear waste management, environmental impact and basic knowledge

3.1.1. Spent fuel and high-level waste characterisation, storage and disposal
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.2. Partitioning and transmutation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.3. Basic actinide research
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.4. Nuclear data
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.5. Medical applications from nuclear research
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.6. Monitoring of radioactivity in the environment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.1.7. Knowledge management, training and education
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Nuclear safety

3.2.1. Nuclear reactor safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.2. Nuclear fuel safety in power reactors operating in the Union
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.3. Safe operation of advanced nuclear energy systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3. Nuclear security

3.3.1. Nuclear safeguards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.2. Additional Protocol
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.3. Open-source information collection on nuclear non-proliferation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.3.4. Combating illicit trafficking of nuclear materials, including nuclear forensic analysis
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. Ethical aspects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .