Commission Decision
of 25 January 2012
on the technical specification for interoperability relating to the control-command and signalling subsystems
(notified under document C(2012) 172)
(Text with EEA relevance)
(2012/88/EU) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Regulation (EU) 2016/919 of 27 May 2016 on the technical specification for interoperability relating to the ‘control-command and signalling’ subsystems of the rail system in the European Union (Text with EEA relevance).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 5 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 6a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 7a . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 8 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 9 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX I . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX II . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX III

1. INTRODUCTION

1.1. Technical scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.2. Geographical scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

1.3. Content of this TSI
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2. SUBSYSTEM DEFINITION AND SCOPE

2.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.2. Scope
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

2.3. Application levels (ERTMS/ETCS)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3. THE ESSENTIAL REQUIREMENTS FOR THE CONTROL-COMMAND AND SIGNALLING SUBSYSTEMS

3.1. General
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2. Specific Aspects of the Control-Command and Signalling Subsystems

3.2.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.2. Reliability and Availability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.3. Health
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.4. Environmental Protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.5. Technical Compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.5.1. Engineering Compatibility

3.2.5.1.1. Physical environmental conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.5.1.2. Railway Internal Electromagnetic Compatibility
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

3.2.5.2. Control-Command and Signalling Compatibility.
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4. CHARACTERISATION OF THE SUBSYSTEMS

4.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2. Functional and technical specifications of the Subsystems

4.2.1. Control-Command and Signalling safety characteristics relevant to interoperability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1.1. Safety
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.1.2. Availability/Reliability
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.2. On-board ERTMS/ETCS functionality
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.3. Track-side ERTMS/ETCS functionality
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.4. Mobile communication functions for railways GSM-R
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.4.1. Basic communication function
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.4.2. Voice and operational communication applications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.4.3. Data communication applications for ETCS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.5. ERTMS/ETCS and GSM-R air gap interfaces
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.5.1. Radio communications with the train
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.5.2. Eurobalise communication with the train
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.5.3. Euroloop communication with the train
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.6. On-Board Interfaces Internal to Control-Command and Signalling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.6.1. ERTMS/ETCS and Class B train protection
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.6.2. Interface between GSM-R Radio Data Communication and ERTMS/ETCS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.6.3. Odometry
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7. Track-side Interfaces Internal to Control-Command and Signalling
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7.1. Functional interface between RBCs
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7.2. RBC/RBC
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7.3. GSM-R/track-side ETCS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7.4. Eurobalise/LEU
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.7.5. Euroloop/LEU
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.8. Key Management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.9. ETCS-ID Management
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.10. Track-side Train Detection Systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.11. Electromagnetic Compatibility between Rolling Stock and Control-Command and Signalling track-side equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.12. ERTMS/ETCS DMI (Driver Machine Interface)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.13. GSM-R DMI (Driver-Machine Interface)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.14. Interface to Data Recording for Regulatory Purposes
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.15. Visibility of track-side Control-Command and Signalling objects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.2.16. Environmental conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3. Functional and technical specifications of the interfaces to other Subsystems

4.3.1. Interface to the Traffic Operation and Management Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3.2. Interface to the Rolling Stock Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3.3. Interfaces to Infrastructure Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.3.4. Interfaces to Energy Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.4. Operating rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.5. Maintenance rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.5.1. Responsibility of the manufacturer of equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.5.2. Responsibility of the applicant for subsystem verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.6. Professional competences
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.7. Health and safety conditions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

4.8. Registers
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5. INTEROPERABILITY CONSTITUENTS

5.1. Definition
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2. List of interoperability constituents

5.2.1. Basic interoperability constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.2.2. Grouping of interoperability constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
1. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
2. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

5.3. Constituents’ performance and specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table 5.1.a Basic interoperability constituents in the Control-Command and Signalling On-board Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table 5.1.b Groups of interoperability constituents in the Control-Command and Signalling On-board Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table 5.2.a Basic interoperability constituents in the Control-Command and Signalling Track-side Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table 5.2.b Groups of interoperability constituents in the Control-Command and Signalling Track-side Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6. ASSESSING THE CONFORMITY AND/OR SUITABILITY FOR USE OF THE CONSTITUENTS AND VERIFYING THE SUBSYSTEMS

6.1. Introduction

6.1.1. General principles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.1.2. Principles for testing ERTMS/ETCS and GSM-R
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2. Interoperability constituents

6.2.1. Assessment procedures for Control-Command and Signalling Interoperability Constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2.2. Modules for Control-Command and Signalling Interoperability Constituents
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2.3. Assessment requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2.4. Special issues

6.2.4.1. The on-board ERTMS/ETCS
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2.4.2. The Specific Transmission Module (STM)
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.2.4.3. Content of the ‘EC’ Declaration of conformity
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3. Control-Command and Signalling Subsystems

6.3.1. Assessment procedures for Control-Command and Signalling Subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.2. Modules for Control-Command and Signalling Subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.2.1. On-board Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.2.2. Track-side Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.2.3. Conditions for using modules for On-board and Track-side Subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.3. Assessment requirements for an On-board Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.3.4. Assessment requirements for a Track-side Subsystem
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.4 Provisions in case of the partial fulfilment TSI requirements

6.4.1. Assessment of parts of control-command and signalling subsystems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.4.2. Control-command and signalling subsystems' partial fulfilment of the requirements due to limited application of the TSI
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

6.4.3. Intermediate Statement of Verification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7. IMPLEMENTING THE TSI CONTROL-COMMAND AND SIGNALLING

7.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2. Generally applicable rules

7.2.1. Upgrading or renewing the Control-Command Track-side Subsystem or parts of it
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.2. Legacy systems
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.3. Availability of Specific Transmission Modules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.4. Additional Class B equipment on a line equipped with Class A
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.5. Rolling stock with Class A and Class B equipment
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.6. Conditions for mandatory and optional functions
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.7. GSM-R specific implementation rules

7.2.7.1. Track-side installations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.7.2. On-board installations
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.8. Train detection systems specific implementation rules
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9. Specific cases

7.2.9.1. Introduction
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.2. Belgium
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.3. United Kingdom
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.4. France
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.5. Poland
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.6. Lithuania, Latvia and Estonia
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.7. Sweden
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.2.9.8. Luxembourg
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3. Rules for ERTMS

7.3.1. The ERTMS European Deployment Plan
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2. ERTMS Track-side Implementation
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.1. Corridors
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.2. Connection to the main European ports, marshalling yards, freight terminals and freight transport areas
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.3. High-speed network
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.4. EU-funded projects
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.5. Notification
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.2.6. Delays
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.3. ERTMS on-board implementation

7.3.3.1. New vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.3.2. Upgrading and renewal of existing vehicles
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.3.3. Additional requirements
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.4. Specific lines constituting the corridors

Corridor A – to be equipped by 2015
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Corridor B
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Corridor C
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Corridor D
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Corridor E
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Corridor F
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

7.3.5. Main European ports, marshalling yards, freight terminals and freight transport areas
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX A

References
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table A 1
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table A 2 List of mandatory specifications
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .

Table A 3 List of mandatory standards
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX B . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX C . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX D . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX E . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX F . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
ANNEX G . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .