ANNEX II

Questionnaire on the implementation of Directive 2010/75/EU as referred to in the third paragraph of Article 1
MODULE 1 —

IMPLEMENTATION UPDATE

Module 1 note:
The scope of these questions is installations covered by Chapter II of Directive 2010/75/EU.
1.

Implementation – changes
Have any major changes to the implementation of Directive 2010/75/EU been made since the last reporting period, compared to the information reported in response to the questionnaire for first reporting under IED? If so, provide an update by describing the changes and the reasons for them, and provide references where appropriate.
2.

Implementation — difficulties
Have you encountered any difficulties in applying the laws, regulations and administrative provisions adopted in accordance with Article 80(1)? If yes, describe these difficulties and the reasons for them.