Commission Implementing Decision
of 7 December 2012
designating the EU reference laboratory for foot-and-mouth disease and repealing Decision 2006/393/EC
(notified under document C(2012) 8901)
(Text with EEA relevance)
(2012/767/EU) (repealed)

. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Repealed by Commission Implementing Decision (EU) 2018/136 of 25 January 2018 designating the European Union reference laboratory for foot-and-mouth disease and amending Annex II to Council Directive 92/119/EEC as regards the European Union reference laboratory for swine vesicular disease (notified under document C(2018) 299) (Text with EEA relevance. ).

Article 1 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 2 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 3 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
Article 4 . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .
. . . . . . . . . . . . . . . . . . . . . . . . . . . . . . . .